Automated wordcount: 31

This was file was automatically generated by a google docs scraper, intended for use with e-reading devices. If you wish to have this removed from this list, email ra.llan.pcl+complaints @ gmail.com.

 This was a mistake.

If you are reading this, I am sorry. All copies are destroyed. And I’m moving on with my life.

Should have never happened.